Kapalit (2024)

“Kapalit” (2024) is a Filipino erotic drama that delves into themes of desire, betrayal, and moral ambiguity. The story follows Audrey, portrayed by Cess Garcia, who is hired as a private nurse by Stan (Matthew Francisco) to care for his ailing wife, Demi (Rica Gonzales). As Audrey becomes more involved in the couple’s lives, she develops feelings for Stan, leading her to scheme to replace Demi as his lover. Directed by Carlo Alvarez and written by Gelo Catamio and Maya Diaz, the film also features performances by Chad Alviar as Richard and Mikhael Padua as Paco. With a runtime of 1 hour and 52 minutes, “Kapalit” was released on March 8, 2024, and is available for streaming on VMX, enriching its collection of VMX movies with its intense narrative and exploration of complex relationships.